%%
%% This is file `lwarp-doipubmed.sty',
%% generated with the docstrip utility.
%%
%% The original source files were:
%%
%% lwarp.dtx  (with options: `doipubmed')
%% This is a generated file.
%% Copyright 2016-2022 Brian Dunn
%% 
%% This work may be distributed and/or modified under the
%% conditions of the LaTeX Project Public License, either version 1.3
%% of this license or (at your option) any later version.
%% The latest version of this license is in
%%   http://www.latex-project.org/lppl.txt
%% and version 1.3 or later is part of all distributions of LaTeX
%% version 2005/12/01 or later.
\LWR@ProvidesPackagePass{doipubmed}[2007/08/20]
\VerifyCommand[lwarp][doipubmed]{\doi}{13FFCBAF4F1414B838B6C3AD344117A8}

\renewcommand*{\doi}[1]{%
\def\@doi@code{}%
\@doi@linksubs#1\#\@@\@doi@code
\@onelevel@sanitize{\@doi@code}%
\def\@doi@text{}%
\@doi@textsubs#1\@nil\@@\@doi@text%
\xpretocmd{\@doi@code}{http://dx.doi.org/}{}{}%
\expandafter\href\expandafter{\@doi@code}{\doitext{\@doi@text}}}
\DeclareDocumentCommand{\LWR@citeurlb}{m}{%
    \LWR@ensuredoingapar%
    \textless%
    \LWR@href@sanitized{#1}{#1}%
    \textgreater%
    \endgroup%
}

\renewrobustcmd*{\citeurl}{%
    \begingroup%
    \LWR@linkcatcodes%
    \LWR@citeurlb%
}

\endinput
%%
%% End of file `lwarp-doipubmed.sty'.
